From 7d74cf62c3d1d0c483bf0c6e134a2b560fd6866e Mon Sep 17 00:00:00 2001
From: dakkar <dakkar@thenautilus.net>
Date: Fri, 21 Jun 2024 15:31:32 +0100
Subject: replaced ti-alert-triangle

---
 packages/frontend/src/widgets/WidgetJobQueue.vue | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'packages/frontend/src/widgets/WidgetJobQueue.vue')

diff --git a/packages/frontend/src/widgets/WidgetJobQueue.vue b/packages/frontend/src/widgets/WidgetJobQueue.vue
index b3e364a6d7..edf6622a13 100644
--- a/packages/frontend/src/widgets/WidgetJobQueue.vue
+++ b/packages/frontend/src/widgets/WidgetJobQueue.vue
@@ -6,7 +6,7 @@ SPDX-License-Identifier: AGPL-3.0-only
 <template>
 <div data-cy-mkw-jobQueue class="mkw-jobQueue _monospace" :class="{ _panel: !widgetProps.transparent }">
 	<div class="inbox">
-		<div class="label">Inbox queue<i v-if="current.inbox.waiting > 0" class="ph-warning ph-bold ph-lg icon"></i></div>
+		<div class="label">Inbox queue<i v-if="current.inbox.waiting > 0" class="ti ti-alert-triangle icon"></i></div>
 		<div class="values">
 			<div>
 				<div>Process</div>
@@ -27,7 +27,7 @@ SPDX-License-Identifier: AGPL-3.0-only
 		</div>
 	</div>
 	<div class="deliver">
-		<div class="label">Deliver queue<i v-if="current.deliver.waiting > 0" class="ph-warning ph-bold ph-lg icon"></i></div>
+		<div class="label">Deliver queue<i v-if="current.deliver.waiting > 0" class="ti ti-alert-triangle icon"></i></div>
 		<div class="values">
 			<div>
 				<div>Process</div>
-- 
cgit v1.2.3-freya

