From fb618dc624ec7fade36617f938ecdfd1705f7020 Mon Sep 17 00:00:00 2001
From: dakkar <dakkar@thenautilus.net>
Date: Fri, 21 Jun 2024 16:53:54 +0100
Subject: replaced ti-chevron-up

---
 packages/frontend/src/ui/deck/column.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'packages/frontend/src/ui/deck/column.vue')

diff --git a/packages/frontend/src/ui/deck/column.vue b/packages/frontend/src/ui/deck/column.vue
index 18f79945d2..a063acccb8 100644
--- a/packages/frontend/src/ui/deck/column.vue
+++ b/packages/frontend/src/ui/deck/column.vue
@@ -26,7 +26,7 @@ SPDX-License-Identifier: AGPL-3.0-only
 		</svg>
 		<div :class="$style.color"></div>
 		<button v-if="isStacked && !isMainColumn" :class="$style.toggleActive" class="_button" @click="toggleActive">
-			<template v-if="active"><i class="ph-caret-up ph-bold ph-lg"></i></template>
+			<template v-if="active"><i class="ti ti-chevron-up"></i></template>
 			<template v-else><i class="ph-caret-down ph-bold ph-lg"></i></template>
 		</button>
 		<span :class="$style.title"><slot name="header"></slot></span>
-- 
cgit v1.2.3-freya

