From 860e8bb5d84c02276dba7631b30fcf06b434e98a Mon Sep 17 00:00:00 2001
From: taiy <53635909+taiyme@users.noreply.github.com>
Date: Fri, 16 Feb 2024 16:17:09 +0900
Subject: fix(frontend/pageMetadata): ページタイトルが更新されない問題 (#13289)
MIME-Version: 1.0
Content-Type: text/plain; charset=UTF-8
Content-Transfer-Encoding: 8bit

Co-authored-by: syuilo <Syuilotan@yahoo.co.jp>
Co-authored-by: syuilo <4439005+syuilo@users.noreply.github.com>
---
 packages/frontend/src/pages/admin/queue.vue | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'packages/frontend/src/pages/admin/queue.vue')

diff --git a/packages/frontend/src/pages/admin/queue.vue b/packages/frontend/src/pages/admin/queue.vue
index 0466649e9e..8d77d927d7 100644
--- a/packages/frontend/src/pages/admin/queue.vue
+++ b/packages/frontend/src/pages/admin/queue.vue
@@ -68,8 +68,8 @@ const headerTabs = computed(() => [{
 	title: 'Inbox',
 }]);
 
-definePageMetadata({
+definePageMetadata(() => ({
 	title: i18n.ts.jobQueue,
 	icon: 'ti ti-clock-play',
-});
+}));
 </script>
-- 
cgit v1.2.3-freya

