From 7d74cf62c3d1d0c483bf0c6e134a2b560fd6866e Mon Sep 17 00:00:00 2001
From: dakkar <dakkar@thenautilus.net>
Date: Fri, 21 Jun 2024 15:31:32 +0100
Subject: replaced ti-alert-triangle

---
 packages/frontend/src/pages/admin/queue.chart.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'packages/frontend/src/pages/admin/queue.chart.vue')

diff --git a/packages/frontend/src/pages/admin/queue.chart.vue b/packages/frontend/src/pages/admin/queue.chart.vue
index f7b4b27a68..8d3fe35320 100644
--- a/packages/frontend/src/pages/admin/queue.chart.vue
+++ b/packages/frontend/src/pages/admin/queue.chart.vue
@@ -30,7 +30,7 @@ SPDX-License-Identifier: AGPL-3.0-only
 		</div>
 	</div>
 	<MkFolder :defaultOpen="true" :max-height="250">
-		<template #icon><i class="ph-warning ph-bold ph-lg"></i></template>
+		<template #icon><i class="ti ti-alert-triangle"></i></template>
 		<template #label>Errored instances</template>
 		<template #suffix>({{ number(jobs.reduce((a, b) => a + b[1], 0)) }} jobs)</template>
 
-- 
cgit v1.2.3-freya

