From bbbb16795d9d09d48ba9efe5a790b28dd4e99cd4 Mon Sep 17 00:00:00 2001
From: かっこかり <67428053+kakkokari-gtyih@users.noreply.github.com>
Date: Wed, 21 Feb 2024 14:27:06 +0900
Subject: refactor(frontend): 不必要なconsole.logを除去・抑制 (#13400)
MIME-Version: 1.0
Content-Type: text/plain; charset=UTF-8
Content-Transfer-Encoding: 8bit

* refactor(frontend): 不必要なconsole.logを除去

* Update MkCode.core.vue

* Update game.board.vue
---
 packages/frontend/src/pages/admin/modlog.vue | 2 --
 1 file changed, 2 deletions(-)

(limited to 'packages/frontend/src/pages/admin/modlog.vue')

diff --git a/packages/frontend/src/pages/admin/modlog.vue b/packages/frontend/src/pages/admin/modlog.vue
index 5e251b8a6f..8590ee1651 100644
--- a/packages/frontend/src/pages/admin/modlog.vue
+++ b/packages/frontend/src/pages/admin/modlog.vue
@@ -54,8 +54,6 @@ const pagination = {
 	})),
 };
 
-console.log(Misskey);
-
 const headerActions = computed(() => []);
 
 const headerTabs = computed(() => []);
-- 
cgit v1.2.3-freya

