From b149a67a4bb86610565bbef46aaf446852e36fbd Mon Sep 17 00:00:00 2001
From: dakkar <dakkar@thenautilus.net>
Date: Fri, 21 Jun 2024 13:20:42 +0100
Subject: replaced ti-shield ti-shield-lock

---
 packages/frontend/src/pages/admin/index.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'packages/frontend/src/pages/admin/index.vue')

diff --git a/packages/frontend/src/pages/admin/index.vue b/packages/frontend/src/pages/admin/index.vue
index 6d347913fe..6ec949aafe 100644
--- a/packages/frontend/src/pages/admin/index.vue
+++ b/packages/frontend/src/pages/admin/index.vue
@@ -190,7 +190,7 @@ const menuDef = computed(() => [{
 		to: '/admin/branding',
 		active: currentPage.value?.route.name === 'branding',
 	}, {
-		icon: 'ph-shield ph-bold ph-lg',
+		icon: 'ti ti-shield',
 		text: i18n.ts.moderation,
 		to: '/admin/moderation',
 		active: currentPage.value?.route.name === 'moderation',
-- 
cgit v1.2.3-freya

