From ad2412d3cd164580abf54ddd1da52818fb0d4996 Mon Sep 17 00:00:00 2001
From: dakkar <dakkar@thenautilus.net>
Date: Fri, 21 Jun 2024 13:09:24 +0100
Subject: replaced ti-check

---
 packages/frontend/src/components/MkUserSetupDialog.User.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'packages/frontend/src/components/MkUserSetupDialog.User.vue')

diff --git a/packages/frontend/src/components/MkUserSetupDialog.User.vue b/packages/frontend/src/components/MkUserSetupDialog.User.vue
index ff356d1895..c80349d034 100644
--- a/packages/frontend/src/components/MkUserSetupDialog.User.vue
+++ b/packages/frontend/src/components/MkUserSetupDialog.User.vue
@@ -19,7 +19,7 @@ SPDX-License-Identifier: AGPL-3.0-only
 	</div>
 	<div :class="$style.footer">
 		<MkButton v-if="!isFollowing" primary gradate rounded full @click="follow"><i class="ti ti-plus"></i> {{ i18n.ts.follow }}</MkButton>
-		<div v-else style="opacity: 0.7; text-align: center;">{{ i18n.ts.youFollowing }} <i class="ph-check ph-bold ph-lg"></i></div>
+		<div v-else style="opacity: 0.7; text-align: center;">{{ i18n.ts.youFollowing }} <i class="ti ti-check"></i></div>
 	</div>
 </div>
 </template>
-- 
cgit v1.2.3-freya

