From b1954d9898f008162d0e371f68065ffcefa6d6c7 Mon Sep 17 00:00:00 2001
From: dakkar <dakkar@thenautilus.net>
Date: Fri, 21 Jun 2024 15:15:04 +0100
Subject: replaced ti-eye-off

---
 packages/frontend/src/components/MkUserSetupDialog.Privacy.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'packages/frontend/src/components/MkUserSetupDialog.Privacy.vue')

diff --git a/packages/frontend/src/components/MkUserSetupDialog.Privacy.vue b/packages/frontend/src/components/MkUserSetupDialog.Privacy.vue
index 91fe4dea3f..d2f6c15ecf 100644
--- a/packages/frontend/src/components/MkUserSetupDialog.Privacy.vue
+++ b/packages/frontend/src/components/MkUserSetupDialog.Privacy.vue
@@ -17,7 +17,7 @@ SPDX-License-Identifier: AGPL-3.0-only
 
 	<MkFolder>
 		<template #label>{{ i18n.ts.hideOnlineStatus }}</template>
-		<template #icon><i class="ph-eye-slash ph-bold ph-lg"></i></template>
+		<template #icon><i class="ti ti-eye-off"></i></template>
 		<template #suffix>{{ hideOnlineStatus ? i18n.ts.on : i18n.ts.off }}</template>
 
 		<MkSwitch v-model="hideOnlineStatus">{{ i18n.ts.hideOnlineStatus }}<template #caption>{{ i18n.ts.hideOnlineStatusDescription }}</template></MkSwitch>
-- 
cgit v1.2.3-freya

