From 1b965dd866100a78bb40363fc71c0e80d6175046 Mon Sep 17 00:00:00 2001
From: dakkar <dakkar@thenautilus.net>
Date: Fri, 21 Jun 2024 15:25:18 +0100
Subject: replaced ti-lock

---
 packages/frontend/src/components/MkUserSetupDialog.Privacy.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'packages/frontend/src/components/MkUserSetupDialog.Privacy.vue')

diff --git a/packages/frontend/src/components/MkUserSetupDialog.Privacy.vue b/packages/frontend/src/components/MkUserSetupDialog.Privacy.vue
index d2f6c15ecf..bc998d6158 100644
--- a/packages/frontend/src/components/MkUserSetupDialog.Privacy.vue
+++ b/packages/frontend/src/components/MkUserSetupDialog.Privacy.vue
@@ -9,7 +9,7 @@ SPDX-License-Identifier: AGPL-3.0-only
 
 	<MkFolder>
 		<template #label>{{ i18n.ts.makeFollowManuallyApprove }}</template>
-		<template #icon><i class="ph-lock ph-bold ph-lg"></i></template>
+		<template #icon><i class="ti ti-lock"></i></template>
 		<template #suffix>{{ isLocked ? i18n.ts.on : i18n.ts.off }}</template>
 
 		<MkSwitch v-model="isLocked">{{ i18n.ts.makeFollowManuallyApprove }}<template #caption>{{ i18n.ts.lockedAccountInfo }}</template></MkSwitch>
-- 
cgit v1.2.3-freya

