From 721b41a43646b8fb02bc775d4941db03b192acfa Mon Sep 17 00:00:00 2001
From: dakkar <dakkar@thenautilus.net>
Date: Fri, 21 Jun 2024 16:33:05 +0100
Subject: replaced ti-checklist

---
 packages/frontend/src/components/MkSignupDialog.rules.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'packages/frontend/src/components/MkSignupDialog.rules.vue')

diff --git a/packages/frontend/src/components/MkSignupDialog.rules.vue b/packages/frontend/src/components/MkSignupDialog.rules.vue
index 9212936db6..d1bb9e5fec 100644
--- a/packages/frontend/src/components/MkSignupDialog.rules.vue
+++ b/packages/frontend/src/components/MkSignupDialog.rules.vue
@@ -6,7 +6,7 @@ SPDX-License-Identifier: AGPL-3.0-only
 <template>
 <div>
 	<div :class="$style.banner">
-		<i class="ph-check ph-bold ph-lglist"></i>
+		<i class="ti ti-checklist"></i>
 	</div>
 	<MkSpacer :marginMin="20" :marginMax="28">
 		<div class="_gaps_m">
-- 
cgit v1.2.3-freya

