From 4910c1f03036aa11cbb24f8fcb136deae34cc2cb Mon Sep 17 00:00:00 2001
From: dakkar <dakkar@thenautilus.net>
Date: Sat, 22 Jun 2024 12:36:09 +0100
Subject: replaced most ti-arrow*

---
 packages/frontend/src/components/MkPullToRefresh.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'packages/frontend/src/components/MkPullToRefresh.vue')

diff --git a/packages/frontend/src/components/MkPullToRefresh.vue b/packages/frontend/src/components/MkPullToRefresh.vue
index b1ec440e42..e0d0b561be 100644
--- a/packages/frontend/src/components/MkPullToRefresh.vue
+++ b/packages/frontend/src/components/MkPullToRefresh.vue
@@ -8,7 +8,7 @@ SPDX-License-Identifier: AGPL-3.0-only
 	<div v-if="isPullStart" :class="$style.frame" :style="`--frame-min-height: ${pullDistance / (PULL_BRAKE_BASE + (pullDistance / PULL_BRAKE_FACTOR))}px;`">
 		<div :class="$style.frameContent">
 			<MkLoading v-if="isRefreshing" :class="$style.loader" :em="true"/>
-			<i v-else class="ph-arrow-line-down ph-bold ph-lg" :class="[$style.icon, { [$style.refresh]: isPullEnd }]"></i>
+			<i v-else class="ti ti-arrow-bar-to-down" :class="[$style.icon, { [$style.refresh]: isPullEnd }]"></i>
 			<div :class="$style.text">
 				<template v-if="isPullEnd">{{ i18n.ts.releaseToRefresh }}</template>
 				<template v-else-if="isRefreshing">{{ i18n.ts.refreshing }}</template>
-- 
cgit v1.2.3-freya

