From 08de1f7baa525c9b59ffb876600149462712cd6b Mon Sep 17 00:00:00 2001
From: Amelia Yukii <123300075+Insert5StarName@users.noreply.github.com>
Date: Fri, 3 Nov 2023 23:20:53 +0100
Subject: fix: icons being inconsistent and PG (#136)

---
 packages/frontend/src/components/MkNoteSub.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'packages/frontend/src/components/MkNoteSub.vue')

diff --git a/packages/frontend/src/components/MkNoteSub.vue b/packages/frontend/src/components/MkNoteSub.vue
index 965c9c6339..11106d3c8f 100644
--- a/packages/frontend/src/components/MkNoteSub.vue
+++ b/packages/frontend/src/components/MkNoteSub.vue
@@ -22,7 +22,7 @@ SPDX-License-Identifier: AGPL-3.0-only
 			<footer :class="$style.footer">
 				<MkReactionsViewer ref="reactionsViewer" :note="note"/>
 				<button class="_button" :class="$style.noteFooterButton" @click="reply()">
-					<i class="ph-arrow-u-up-left ph-bold pg-lg"></i>
+					<i class="ph-arrow-u-up-left ph-bold ph-lg"></i>
 					<p v-if="note.repliesCount > 0" :class="$style.noteFooterButtonCount">{{ note.repliesCount }}</p>
 				</button>
 				<button
-- 
cgit v1.2.3-freya

