From a977d4316d596ce89f1fec55d6962262a9405d12 Mon Sep 17 00:00:00 2001
From: Insert5StarName <anime@shourai.de>
Date: Sun, 15 Oct 2023 19:25:36 +0200
Subject: fix: wrong scaling in notifications container

---
 packages/frontend/src/components/MkNoteSub.vue | 7 +++++++
 1 file changed, 7 insertions(+)

(limited to 'packages/frontend/src/components/MkNoteSub.vue')

diff --git a/packages/frontend/src/components/MkNoteSub.vue b/packages/frontend/src/components/MkNoteSub.vue
index 851be936cc..0e81f82968 100644
--- a/packages/frontend/src/components/MkNoteSub.vue
+++ b/packages/frontend/src/components/MkNoteSub.vue
@@ -448,6 +448,13 @@ if (props.detail) {
 		color: var(--fgHighlighted);
 	}
 }
+@container (max-width: 400px) {
+	.noteFooterButton {
+		&:not(:last-child) {
+			margin-right: 0.7em;
+		}
+	}
+}
 
 .noteFooterButtonCount {
 	display: inline;
-- 
cgit v1.2.3-freya

