From 1b965dd866100a78bb40363fc71c0e80d6175046 Mon Sep 17 00:00:00 2001
From: dakkar <dakkar@thenautilus.net>
Date: Fri, 21 Jun 2024 15:25:18 +0100
Subject: replaced ti-lock

---
 packages/frontend/src/components/MkNoteHeader.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'packages/frontend/src/components/MkNoteHeader.vue')

diff --git a/packages/frontend/src/components/MkNoteHeader.vue b/packages/frontend/src/components/MkNoteHeader.vue
index 0d284ef480..4bb27010fb 100644
--- a/packages/frontend/src/components/MkNoteHeader.vue
+++ b/packages/frontend/src/components/MkNoteHeader.vue
@@ -25,7 +25,7 @@ SPDX-License-Identifier: AGPL-3.0-only
 		</MkA>
 		<span v-if="note.visibility !== 'public'" style="margin-left: 0.5em;" :title="i18n.ts._visibility[note.visibility]">
 			<i v-if="note.visibility === 'home'" class="ti ti-home"></i>
-			<i v-else-if="note.visibility === 'followers'" class="ph-lock ph-bold ph-lg"></i>
+			<i v-else-if="note.visibility === 'followers'" class="ti ti-lock"></i>
 			<i v-else-if="note.visibility === 'specified'" ref="specified" class="ph-envelope ph-bold ph-lg"></i>
 		</span>
 		<span v-if="note.updatedAt" ref="menuVersionsButton" style="margin-left: 0.5em; cursor: pointer;" title="Edited" @mousedown="menuVersions()"><i class="ph-pencil-simple ph-bold ph-lg"></i></span>
-- 
cgit v1.2.3-freya

