From ae5d052274b1ac3d3c7849e7f18d97c5822446d3 Mon Sep 17 00:00:00 2001
From: ShittyKopper <shittykopper@w.on-t.work>
Date: Tue, 31 Oct 2023 21:44:34 +0300
Subject: upd: implement radius setting

to keep things manageable i merged a lot of one off values into just a
handful of common sizes, so some parts of the ui will look different than
upstream even with the "Misskey" rounding mode
---
 packages/frontend/src/components/MkInstanceCardMini.vue | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'packages/frontend/src/components/MkInstanceCardMini.vue')

diff --git a/packages/frontend/src/components/MkInstanceCardMini.vue b/packages/frontend/src/components/MkInstanceCardMini.vue
index e384b7a0bc..6af9c6ccb5 100644
--- a/packages/frontend/src/components/MkInstanceCardMini.vue
+++ b/packages/frontend/src/components/MkInstanceCardMini.vue
@@ -46,14 +46,14 @@ function getInstanceIcon(instance): string {
 	align-items: center;
 	padding: 16px;
 	background: var(--panel);
-	border-radius: 8px;
+	border-radius: var(--radius-sm);
 
 	> :global(.icon) {
 		display: block;
 		width: ($bodyTitleHieght + $bodyInfoHieght);
 		height: ($bodyTitleHieght + $bodyInfoHieght);
 		object-fit: cover;
-		border-radius: 4px;
+		border-radius: var(--radius-xs);
 		margin-right: 10px;
 	}
 
-- 
cgit v1.2.3-freya

