From fb618dc624ec7fade36617f938ecdfd1705f7020 Mon Sep 17 00:00:00 2001
From: dakkar <dakkar@thenautilus.net>
Date: Fri, 21 Jun 2024 16:53:54 +0100
Subject: replaced ti-chevron-up

---
 packages/frontend/src/components/MkFolder.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'packages/frontend/src/components/MkFolder.vue')

diff --git a/packages/frontend/src/components/MkFolder.vue b/packages/frontend/src/components/MkFolder.vue
index 64d390f52b..00d986b788 100644
--- a/packages/frontend/src/components/MkFolder.vue
+++ b/packages/frontend/src/components/MkFolder.vue
@@ -19,7 +19,7 @@ SPDX-License-Identifier: AGPL-3.0-only
 				</div>
 				<div :class="$style.headerRight">
 					<span :class="$style.headerRightText"><slot name="suffix"></slot></span>
-					<i v-if="opened" class="ph-caret-up ph-bold ph-lg icon"></i>
+					<i v-if="opened" class="ti ti-chevron-up icon"></i>
 					<i v-else class="ph-caret-down ph-bold ph-lg icon"></i>
 				</div>
 			</div>
-- 
cgit v1.2.3-freya

