From 504ff4c2af04d474cdd6d3da5c469d9ca00ce9e1 Mon Sep 17 00:00:00 2001
From: dakkar <dakkar@thenautilus.net>
Date: Sun, 21 Apr 2024 11:17:17 +0100
Subject: increase page size for most admin lists - #491

Since I can't quite figure out how to prevent `MkPagination` from
truncating the lists too eagerly, I'm going to hide the problem by
making it truncate _less_.
---
 packages/frontend/src/components/MkFileListForAdmin.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'packages/frontend/src/components/MkFileListForAdmin.vue')

diff --git a/packages/frontend/src/components/MkFileListForAdmin.vue b/packages/frontend/src/components/MkFileListForAdmin.vue
index f3305e9f54..bab844c27f 100644
--- a/packages/frontend/src/components/MkFileListForAdmin.vue
+++ b/packages/frontend/src/components/MkFileListForAdmin.vue
@@ -5,7 +5,7 @@ SPDX-License-Identifier: AGPL-3.0-only
 
 <template>
 <div>
-	<MkPagination v-slot="{items}" :pagination="pagination" class="urempief" :class="{ grid: viewMode === 'grid' }">
+	<MkPagination v-slot="{items}" :pagination="pagination" :displayLimit="50" class="urempief" :class="{ grid: viewMode === 'grid' }">
 		<MkA
 			v-for="file in (items as Misskey.entities.DriveFile[])"
 			:key="file.id"
-- 
cgit v1.2.3-freya

