From ad2412d3cd164580abf54ddd1da52818fb0d4996 Mon Sep 17 00:00:00 2001
From: dakkar <dakkar@thenautilus.net>
Date: Fri, 21 Jun 2024 13:09:24 +0100
Subject: replaced ti-check

---
 packages/frontend/src/components/MkDialog.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'packages/frontend/src/components/MkDialog.vue')

diff --git a/packages/frontend/src/components/MkDialog.vue b/packages/frontend/src/components/MkDialog.vue
index 01996be4e0..1519048e08 100644
--- a/packages/frontend/src/components/MkDialog.vue
+++ b/packages/frontend/src/components/MkDialog.vue
@@ -18,7 +18,7 @@ SPDX-License-Identifier: AGPL-3.0-only
 				[$style.type_info]: type === 'info',
 			}]"
 		>
-			<i v-if="type === 'success'" :class="$style.iconInner" class="ph-check ph-bold ph-lg"></i>
+			<i v-if="type === 'success'" :class="$style.iconInner" class="ti ti-check"></i>
 			<i v-else-if="type === 'error'" :class="$style.iconInner" class="ti ti-circle-x"></i>
 			<i v-else-if="type === 'warning'" :class="$style.iconInner" class="ph-warning ph-bold ph-lg"></i>
 			<i v-else-if="type === 'info'" :class="$style.iconInner" class="ph-info ph-bold ph-lg"></i>
-- 
cgit v1.2.3-freya

