From 7d74cf62c3d1d0c483bf0c6e134a2b560fd6866e Mon Sep 17 00:00:00 2001
From: dakkar <dakkar@thenautilus.net>
Date: Fri, 21 Jun 2024 15:31:32 +0100
Subject: replaced ti-alert-triangle

---
 packages/frontend/src/components/MkDialog.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'packages/frontend/src/components/MkDialog.vue')

diff --git a/packages/frontend/src/components/MkDialog.vue b/packages/frontend/src/components/MkDialog.vue
index af93ef333e..ae70b62564 100644
--- a/packages/frontend/src/components/MkDialog.vue
+++ b/packages/frontend/src/components/MkDialog.vue
@@ -20,7 +20,7 @@ SPDX-License-Identifier: AGPL-3.0-only
 		>
 			<i v-if="type === 'success'" :class="$style.iconInner" class="ti ti-check"></i>
 			<i v-else-if="type === 'error'" :class="$style.iconInner" class="ti ti-circle-x"></i>
-			<i v-else-if="type === 'warning'" :class="$style.iconInner" class="ph-warning ph-bold ph-lg"></i>
+			<i v-else-if="type === 'warning'" :class="$style.iconInner" class="ti ti-alert-triangle"></i>
 			<i v-else-if="type === 'info'" :class="$style.iconInner" class="ph-info ph-bold ph-lg"></i>
 			<i v-else-if="type === 'question'" :class="$style.iconInner" class="ph-question ph-bold ph-lg"></i>
 			<MkLoading v-else-if="type === 'waiting'" :class="$style.iconInner" :em="true"/>
-- 
cgit v1.2.3-freya

