From fb618dc624ec7fade36617f938ecdfd1705f7020 Mon Sep 17 00:00:00 2001
From: dakkar <dakkar@thenautilus.net>
Date: Fri, 21 Jun 2024 16:53:54 +0100
Subject: replaced ti-chevron-up

---
 packages/frontend/src/components/MkContainer.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'packages/frontend/src/components/MkContainer.vue')

diff --git a/packages/frontend/src/components/MkContainer.vue b/packages/frontend/src/components/MkContainer.vue
index 95188c335e..c47571885a 100644
--- a/packages/frontend/src/components/MkContainer.vue
+++ b/packages/frontend/src/components/MkContainer.vue
@@ -13,7 +13,7 @@ SPDX-License-Identifier: AGPL-3.0-only
 		<div :class="$style.headerSub">
 			<slot name="func" :buttonStyleClass="$style.headerButton"></slot>
 			<button v-if="foldable" :class="$style.headerButton" class="_button" @click="() => showBody = !showBody">
-				<template v-if="showBody"><i class="ph-caret-up ph-bold ph-lg"></i></template>
+				<template v-if="showBody"><i class="ti ti-chevron-up"></i></template>
 				<template v-else><i class="ph-caret-down ph-bold ph-lg"></i></template>
 			</button>
 		</div>
-- 
cgit v1.2.3-freya

