From 7eed0aec697c8188465e4a070f1a86555dade2ac Mon Sep 17 00:00:00 2001
From: dakkar <dakkar@thenautilus.net>
Date: Fri, 21 Jun 2024 14:59:21 +0100
Subject: replaced ti-code

---
 packages/frontend/src/components/MkCode.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'packages/frontend/src/components/MkCode.vue')

diff --git a/packages/frontend/src/components/MkCode.vue b/packages/frontend/src/components/MkCode.vue
index e5589813e1..a940117909 100644
--- a/packages/frontend/src/components/MkCode.vue
+++ b/packages/frontend/src/components/MkCode.vue
@@ -16,7 +16,7 @@ SPDX-License-Identifier: AGPL-3.0-only
 		<pre v-else-if="show" :class="$style.codeBlockFallbackRoot"><code :class="$style.codeBlockFallbackCode">{{ code }}</code></pre>
 		<button v-else :class="$style.codePlaceholderRoot" @click="show = true">
 			<div :class="$style.codePlaceholderContainer">
-				<div><i class="ph-code ph-bold ph-lg"></i> {{ i18n.ts.code }}</div>
+				<div><i class="ti ti-code"></i> {{ i18n.ts.code }}</div>
 				<div>{{ i18n.ts.clickToShow }}</div>
 			</div>
 		</button>
-- 
cgit v1.2.3-freya

