From 1ac1a968b9edd801aa13e8dae56ca378744d9e2e Mon Sep 17 00:00:00 2001
From: syuilo <Syuilotan@yahoo.co.jp>
Date: Thu, 30 Sep 2021 00:50:45 +0900
Subject: refactor components

---
 src/client/components/taskmanager.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/client/components/taskmanager.vue')

diff --git a/src/client/components/taskmanager.vue b/src/client/components/taskmanager.vue
index cb8cb78748..6f3d1b0354 100644
--- a/src/client/components/taskmanager.vue
+++ b/src/client/components/taskmanager.vue
@@ -4,7 +4,7 @@
 		<i class="fas fa-terminal" style="margin-right: 0.5em;"></i>Task Manager
 	</template>
 	<div class="qljqmnzj _monospace">
-		<MkTab v-model:value="tab" style="border-bottom: solid 0.5px var(--divider);">
+		<MkTab v-model="tab" style="border-bottom: solid 0.5px var(--divider);">
 			<option value="windows">Windows</option>
 			<option value="stream">Stream</option>
 			<option value="streamPool">Stream (Pool)</option>
-- 
cgit v1.2.3-freya

