From 2154354a4f4442c03c48936872eadba76335ab8d Mon Sep 17 00:00:00 2001
From: tamaina <tamaina@hotmail.co.jp>
Date: Tue, 2 Mar 2021 22:57:16 +0900
Subject: Revert "perf: use overflow: clip instead of hidden" (#7273)

This reverts commit 06e817af597e7ee621bdeb370c72d7555482d943.
---
 src/client/components/note.vue | 9 +++------
 1 file changed, 3 insertions(+), 6 deletions(-)

(limited to 'src/client/components/note.vue')

diff --git a/src/client/components/note.vue b/src/client/components/note.vue
index dab7643762..bc2f87fe85 100644
--- a/src/client/components/note.vue
+++ b/src/client/components/note.vue
@@ -861,8 +861,7 @@ export default defineComponent({
 .tkcbzcuz {
 	position: relative;
 	transition: box-shadow 0.1s ease;
-	overflow: hidden; // overflow: clip; をSafariが対応したら消す
-	overflow: clip;
+	overflow: hidden;
 	contain: content;
 
 	// これらの指定はパフォーマンス向上には有効だが、ノートの高さは一定でないため、
@@ -949,8 +948,7 @@ export default defineComponent({
 		}
 
 		> span {
-			overflow: hidden; // overflow: clip; をSafariが対応したら消す
-			overflow: clip;
+			overflow: hidden;
 			flex-shrink: 1;
 			text-overflow: ellipsis;
 			white-space: nowrap;
@@ -1022,8 +1020,7 @@ export default defineComponent({
 					&.collapsed {
 						position: relative;
 						max-height: 9em;
-						overflow: hidden; // overflow: clip; をSafariが対応したら消す
-						overflow: clip;
+						overflow: hidden;
 
 						> .fade {
 							display: block;
-- 
cgit v1.2.3-freya

