From 8c7bcdf998844d419496b5c767a8e0c83c0a2757 Mon Sep 17 00:00:00 2001
From: NoriDev <11006910+noridev@users.noreply.github.com>
Date: Sat, 17 Jun 2023 13:54:54 +0900
Subject: fix(client): サーバーメトリクスが90度傾いている (#11012)
MIME-Version: 1.0
Content-Type: text/plain; charset=UTF-8
Content-Transfer-Encoding: 8bit

---
 packages/frontend/src/widgets/server-metric/pie.vue | 1 +
 1 file changed, 1 insertion(+)

(limited to 'packages/frontend/src/widgets/server-metric/pie.vue')

diff --git a/packages/frontend/src/widgets/server-metric/pie.vue b/packages/frontend/src/widgets/server-metric/pie.vue
index 398815a6ae..8f7471061a 100644
--- a/packages/frontend/src/widgets/server-metric/pie.vue
+++ b/packages/frontend/src/widgets/server-metric/pie.vue
@@ -15,6 +15,7 @@
 		:stroke-dashoffset="strokeDashoffset"
 		fill="none"
 		stroke-width="0.1"
+		:class="$style.circle"
 		:stroke="color"
 	/>
 	<text x="50%" y="50%" dy="0.05" text-anchor="middle" :class="$style.text">{{ (value * 100).toFixed(0) }}%</text>
-- 
cgit v1.3.1-freya

