From be7e3b9a0cb81b78a744993fef2fa2fd2833fa9c Mon Sep 17 00:00:00 2001
From: syuilo <4439005+syuilo@users.noreply.github.com>
Date: Sun, 9 Mar 2025 14:28:01 +0900
Subject: refactor(frontend): scripts -> utility

---
 packages/frontend/src/widgets/WidgetUnixClock.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'packages/frontend/src/widgets/WidgetUnixClock.vue')

diff --git a/packages/frontend/src/widgets/WidgetUnixClock.vue b/packages/frontend/src/widgets/WidgetUnixClock.vue
index f85d27d6aa..f51ef12a2a 100644
--- a/packages/frontend/src/widgets/WidgetUnixClock.vue
+++ b/packages/frontend/src/widgets/WidgetUnixClock.vue
@@ -19,7 +19,7 @@ SPDX-License-Identifier: AGPL-3.0-only
 import { onUnmounted, ref, watch } from 'vue';
 import { useWidgetPropsManager } from './widget.js';
 import type { WidgetComponentEmits, WidgetComponentExpose, WidgetComponentProps } from './widget.js';
-import type { GetFormResultType } from '@/scripts/form.js';
+import type { GetFormResultType } from '@/utility/form.js';
 
 const name = 'unixClock';
 
-- 
cgit v1.2.3-freya

