From 4285303c8155dd91be7dcbb865d5e8f7cb0e1c71 Mon Sep 17 00:00:00 2001
From: かっこかり <67428053+kakkokari-gtyih@users.noreply.github.com>
Date: Tue, 30 Dec 2025 14:32:40 +0900
Subject: fix(frontend): follow-up of #17033 (#17047)
MIME-Version: 1.0
Content-Type: text/plain; charset=UTF-8
Content-Transfer-Encoding: 8bit

* wip

* fix

* ref -> reactive

* tweak throttle threshold

* tweak throttle threshold

* rss設定にはmanualSaveを使用するように

* Update MkWidgetSettingsDialog.vue

---------

Co-authored-by: syuilo <4439005+syuilo@users.noreply.github.com>
---
 packages/frontend/src/widgets/WidgetRssTicker.vue | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'packages/frontend/src/widgets/WidgetRssTicker.vue')

diff --git a/packages/frontend/src/widgets/WidgetRssTicker.vue b/packages/frontend/src/widgets/WidgetRssTicker.vue
index 95f82f7d7b..b0d9eec883 100644
--- a/packages/frontend/src/widgets/WidgetRssTicker.vue
+++ b/packages/frontend/src/widgets/WidgetRssTicker.vue
@@ -44,6 +44,7 @@ const widgetPropsDef = {
 	url: {
 		type: 'string',
 		default: 'http://feeds.afpbb.com/rss/afpbb/afpbbnews',
+		manualSave: true,
 	},
 	shuffle: {
 		type: 'boolean',
@@ -119,7 +120,7 @@ const tick = () => {
 		});
 };
 
-watch(() => fetchEndpoint, tick);
+watch(fetchEndpoint, tick);
 watch(() => widgetProps.refreshIntervalSec, () => {
 	if (intervalClear.value) {
 		intervalClear.value();
-- 
cgit v1.2.3-freya

