From be7e3b9a0cb81b78a744993fef2fa2fd2833fa9c Mon Sep 17 00:00:00 2001
From: syuilo <4439005+syuilo@users.noreply.github.com>
Date: Sun, 9 Mar 2025 14:28:01 +0900
Subject: refactor(frontend): scripts -> utility

---
 packages/frontend/src/widgets/WidgetDigitalClock.vue | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'packages/frontend/src/widgets/WidgetDigitalClock.vue')

diff --git a/packages/frontend/src/widgets/WidgetDigitalClock.vue b/packages/frontend/src/widgets/WidgetDigitalClock.vue
index 6e0c9e6dfc..d79ec79d4f 100644
--- a/packages/frontend/src/widgets/WidgetDigitalClock.vue
+++ b/packages/frontend/src/widgets/WidgetDigitalClock.vue
@@ -17,8 +17,8 @@ SPDX-License-Identifier: AGPL-3.0-only
 import { computed } from 'vue';
 import { useWidgetPropsManager } from './widget.js';
 import type { WidgetComponentEmits, WidgetComponentExpose, WidgetComponentProps } from './widget.js';
-import type { GetFormResultType } from '@/scripts/form.js';
-import { timezones } from '@/scripts/timezones.js';
+import type { GetFormResultType } from '@/utility/form.js';
+import { timezones } from '@/utility/timezones.js';
 import MkDigitalClock from '@/components/MkDigitalClock.vue';
 
 const name = 'digitalClock';
-- 
cgit v1.2.3-freya

