From 596e517f77a7f2f48fd9bd4fea78e72af44ac6d4 Mon Sep 17 00:00:00 2001
From: syuilo <4439005+syuilo@users.noreply.github.com>
Date: Thu, 20 Mar 2025 12:58:18 +0900
Subject: fix(frontend): minimum uiが表示できない
MIME-Version: 1.0
Content-Type: text/plain; charset=UTF-8
Content-Transfer-Encoding: 8bit

---
 packages/frontend/src/ui/minimum.vue | 9 +++------
 1 file changed, 3 insertions(+), 6 deletions(-)

(limited to 'packages/frontend/src/ui/minimum.vue')

diff --git a/packages/frontend/src/ui/minimum.vue b/packages/frontend/src/ui/minimum.vue
index 4bfd240805..94382b664a 100644
--- a/packages/frontend/src/ui/minimum.vue
+++ b/packages/frontend/src/ui/minimum.vue
@@ -5,9 +5,7 @@ SPDX-License-Identifier: AGPL-3.0-only
 
 <template>
 <div :class="$style.root">
-	<div style="height: 100%;">
-		<RouterView/>
-	</div>
+	<RouterView/>
 
 	<XCommon/>
 </div>
@@ -39,12 +37,11 @@ provideMetadataReceiver((metadataGetter) => {
 	}
 });
 provideReactiveMetadata(pageMetadata);
-
-document.documentElement.style.overflowY = 'scroll';
 </script>
 
 <style lang="scss" module>
 .root {
-	min-height: 100dvh;
+	position: relative;
+	height: 100dvh;
 }
 </style>
-- 
cgit v1.2.3-freya

