From cdb0566c5b823f0ce4ecc493bd459cb726431be2 Mon Sep 17 00:00:00 2001
From: かっこかり <67428053+kakkokari-gtyih@users.noreply.github.com>
Date: Fri, 6 Sep 2024 16:12:14 +0900
Subject: refactor(frontend): scss deprecated 警告に対応 (#14513)
MIME-Version: 1.0
Content-Type: text/plain; charset=UTF-8
Content-Transfer-Encoding: 8bit

---
 packages/frontend/src/ui/_common_/statusbars.vue | 16 ++++++++--------
 1 file changed, 8 insertions(+), 8 deletions(-)

(limited to 'packages/frontend/src/ui/_common_/statusbars.vue')

diff --git a/packages/frontend/src/ui/_common_/statusbars.vue b/packages/frontend/src/ui/_common_/statusbars.vue
index 872c69810c..690366307b 100644
--- a/packages/frontend/src/ui/_common_/statusbars.vue
+++ b/packages/frontend/src/ui/_common_/statusbars.vue
@@ -40,6 +40,14 @@ const XUserList = defineAsyncComponent(() => import('./statusbar-user-list.vue')
 	--nameMargin: 10px;
 	font-size: 0.85em;
 
+	display: flex;
+	vertical-align: bottom;
+	width: 100%;
+	line-height: var(--height);
+	height: var(--height);
+	overflow: clip;
+	contain: strict;
+
 	&.verySmall {
 		--nameMargin: 7px;
 		--height: 16px;
@@ -64,14 +72,6 @@ const XUserList = defineAsyncComponent(() => import('./statusbar-user-list.vue')
 		font-size: 0.9em;
 	}
 
-	display: flex;
-	vertical-align: bottom;
-	width: 100%;
-	line-height: var(--height);
-	height: var(--height);
-	overflow: clip;
-	contain: strict;
-
 	&.black {
 		background: #000;
 		color: #fff;
-- 
cgit v1.2.3-freya

