From 0a1ff77f23f0fdbc569f6184bad74ae86cd45a2e Mon Sep 17 00:00:00 2001
From: syuilo <4439005+syuilo@users.noreply.github.com>
Date: Sun, 27 Apr 2025 19:55:56 +0900
Subject: perf(frontend): use css-native implementation for spacer rather than
 vue component

---
 packages/frontend/src/pages/admin/performance.vue | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'packages/frontend/src/pages/admin/performance.vue')

diff --git a/packages/frontend/src/pages/admin/performance.vue b/packages/frontend/src/pages/admin/performance.vue
index 075db4ebef..a272b9adea 100644
--- a/packages/frontend/src/pages/admin/performance.vue
+++ b/packages/frontend/src/pages/admin/performance.vue
@@ -5,7 +5,7 @@ SPDX-License-Identifier: AGPL-3.0-only
 
 <template>
 <PageWithHeader :actions="headerActions" :tabs="headerTabs">
-	<MkSpacer :contentMax="700" :marginMin="16" :marginMax="32">
+	<div class="_spacer" style="--MI_SPACER-w: 700px; --MI_SPACER-min: 16px; --MI_SPACER-max: 32px;">
 		<div class="_gaps">
 			<div class="_panel" style="padding: 16px;">
 				<MkSwitch v-model="enableServerMachineStats" @change="onChange_enableServerMachineStats">
@@ -102,7 +102,7 @@ SPDX-License-Identifier: AGPL-3.0-only
 				</div>
 			</MkFolder>
 		</div>
-	</MkSpacer>
+	</div>
 </PageWithHeader>
 </template>
 
-- 
cgit v1.2.3-freya

