From dca42fd6e67b4b7b4fe97428e792cc299d2afaa8 Mon Sep 17 00:00:00 2001
From: syuilo <4439005+syuilo@users.noreply.github.com>
Date: Sun, 16 Mar 2025 13:59:08 +0900
Subject: enhance(frontend): improve ux for touch devices

---
 packages/frontend/src/pages/_error_.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'packages/frontend/src/pages/_error_.vue')

diff --git a/packages/frontend/src/pages/_error_.vue b/packages/frontend/src/pages/_error_.vue
index 066980db1f..791267f5ca 100644
--- a/packages/frontend/src/pages/_error_.vue
+++ b/packages/frontend/src/pages/_error_.vue
@@ -7,7 +7,7 @@ SPDX-License-Identifier: AGPL-3.0-only
 <MkLoading v-if="!loaded"/>
 <Transition :name="prefer.s.animation ? '_transition_zoom' : ''" appear>
 	<div v-show="loaded" :class="$style.root">
-		<img :src="serverErrorImageUrl" class="_ghost" :class="$style.img"/>
+		<img :src="serverErrorImageUrl" draggable="false" :class="$style.img"/>
 		<div class="_gaps">
 			<div><b><i class="ti ti-alert-triangle"></i> {{ i18n.ts.pageLoadError }}</b></div>
 			<div v-if="meta && (version === meta.version)">{{ i18n.ts.pageLoadErrorDescription }}</div>
-- 
cgit v1.2.3-freya

