From be7e3b9a0cb81b78a744993fef2fa2fd2833fa9c Mon Sep 17 00:00:00 2001
From: syuilo <4439005+syuilo@users.noreply.github.com>
Date: Sun, 9 Mar 2025 14:28:01 +0900
Subject: refactor(frontend): scripts -> utility

---
 packages/frontend/src/components/grid/MkDataCell.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'packages/frontend/src/components/grid/MkDataCell.vue')

diff --git a/packages/frontend/src/components/grid/MkDataCell.vue b/packages/frontend/src/components/grid/MkDataCell.vue
index c2dc05efe6..f813bcb73f 100644
--- a/packages/frontend/src/components/grid/MkDataCell.vue
+++ b/packages/frontend/src/components/grid/MkDataCell.vue
@@ -90,7 +90,7 @@ SPDX-License-Identifier: AGPL-3.0-only
 <script setup lang="ts">
 import { computed, defineAsyncComponent, nextTick, onMounted, onUnmounted, ref, shallowRef, toRefs, watch } from 'vue';
 import { GridEventEmitter } from '@/components/grid/grid.js';
-import { useTooltip } from '@/scripts/use-tooltip.js';
+import { useTooltip } from '@/utility/use-tooltip.js';
 import * as os from '@/os.js';
 import { equalCellAddress, getCellAddress } from '@/components/grid/grid-utils.js';
 import type { Size } from '@/components/grid/grid.js';
-- 
cgit v1.2.3-freya

