From ca2ed0a59bca26243d4f2f0d75546110cc439268 Mon Sep 17 00:00:00 2001
From: syuilo <Syuilotan@yahoo.co.jp>
Date: Wed, 17 May 2023 11:08:46 +0900
Subject: :art:

---
 packages/frontend/src/components/MkUserSetupDialog.vue | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'packages/frontend/src/components/MkUserSetupDialog.vue')

diff --git a/packages/frontend/src/components/MkUserSetupDialog.vue b/packages/frontend/src/components/MkUserSetupDialog.vue
index 066556a05b..5c04faadca 100644
--- a/packages/frontend/src/components/MkUserSetupDialog.vue
+++ b/packages/frontend/src/components/MkUserSetupDialog.vue
@@ -27,7 +27,7 @@
 		>
 			<template v-if="page === 0">
 				<div :class="$style.centerPage">
-					<MkAnimBg style="position: absolute; top: 0;"/>
+					<MkAnimBg style="position: absolute; top: 0;" :scale="1.5"/>
 					<MkSpacer :margin-min="20" :margin-max="28">
 						<div class="_gaps" style="text-align: center;">
 							<i class="ti ti-confetti" style="display: block; margin: auto; font-size: 3em; color: var(--accent);"></i>
@@ -83,7 +83,7 @@
 			</template>
 			<template v-else-if="page === 5">
 				<div :class="$style.centerPage">
-					<MkAnimBg style="position: absolute; top: 0;"/>
+					<MkAnimBg style="position: absolute; top: 0;" :scale="1.5"/>
 					<MkSpacer :margin-min="20" :margin-max="28">
 						<div class="_gaps" style="text-align: center;">
 							<i class="ti ti-check" style="display: block; margin: auto; font-size: 3em; color: var(--accent);"></i>
-- 
cgit v1.2.3-freya

