From 83893ce52f6cfea9cc0d5175931e83b10f21fdfc Mon Sep 17 00:00:00 2001
From: syuilo <4439005+syuilo@users.noreply.github.com>
Date: Sun, 27 Apr 2025 20:04:13 +0900
Subject: fix syntax errors

---
 packages/frontend/src/components/MkUserSetupDialog.vue | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'packages/frontend/src/components/MkUserSetupDialog.vue')

diff --git a/packages/frontend/src/components/MkUserSetupDialog.vue b/packages/frontend/src/components/MkUserSetupDialog.vue
index 53ab557fed..82214ed5a5 100644
--- a/packages/frontend/src/components/MkUserSetupDialog.vue
+++ b/packages/frontend/src/components/MkUserSetupDialog.vue
@@ -47,7 +47,7 @@ SPDX-License-Identifier: AGPL-3.0-only
 			<template v-else-if="page === 1">
 				<div style="height: 100cqh; overflow: auto;">
 					<div :class="$style.pageRoot">
-						<div class="_spacer" style="--MI_SPACER-min: 20px; --MI_SPACER-max: 28" :class="$style.pageMainpx;">
+						<div class="_spacer" style="--MI_SPACER-min: 20px; --MI_SPACER-max: 28px;" :class="$style.pageMain">
 							<XProfile/>
 						</div>
 						<div :class="$style.pageFooter">
@@ -62,7 +62,7 @@ SPDX-License-Identifier: AGPL-3.0-only
 			<template v-else-if="page === 2">
 				<div style="height: 100cqh; overflow: auto;">
 					<div :class="$style.pageRoot">
-						<div class="_spacer" style="--MI_SPACER-min: 20px; --MI_SPACER-max: 28" :class="$style.pageMainpx;">
+						<div class="_spacer" style="--MI_SPACER-min: 20px; --MI_SPACER-max: 28px;" :class="$style.pageMain">
 							<XPrivacy/>
 						</div>
 						<div :class="$style.pageFooter">
-- 
cgit v1.2.3-freya

