From b668d161a9a0a2f73c487f3fa6d54fd7597635a5 Mon Sep 17 00:00:00 2001
From: かっこかり <67428053+kakkokari-gtyih@users.noreply.github.com>
Date: Thu, 10 Oct 2024 16:12:16 +0900
Subject: refactor(frontend): prefix css variables (UI) (#14739)

* refactor(frontend): prefix css variables

* `MI_UI` -> `MI`

* fix

* `stickyBottom`

* stickyTop
---
 packages/frontend/src/components/MkUserSetupDialog.Follow.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'packages/frontend/src/components/MkUserSetupDialog.Follow.vue')

diff --git a/packages/frontend/src/components/MkUserSetupDialog.Follow.vue b/packages/frontend/src/components/MkUserSetupDialog.Follow.vue
index 1524ea0ec9..5153c06139 100644
--- a/packages/frontend/src/components/MkUserSetupDialog.Follow.vue
+++ b/packages/frontend/src/components/MkUserSetupDialog.Follow.vue
@@ -62,7 +62,7 @@ const popularUsers: Paging = {
 .users {
 	display: grid;
 	grid-template-columns: repeat(auto-fill, minmax(230px, 1fr));
-	grid-gap: var(--margin);
+	grid-gap: var(--MI-margin);
 	justify-content: center;
 }
 </style>
-- 
cgit v1.2.3-freya

