From b668d161a9a0a2f73c487f3fa6d54fd7597635a5 Mon Sep 17 00:00:00 2001
From: かっこかり <67428053+kakkokari-gtyih@users.noreply.github.com>
Date: Thu, 10 Oct 2024 16:12:16 +0900
Subject: refactor(frontend): prefix css variables (UI) (#14739)

* refactor(frontend): prefix css variables

* `MI_UI` -> `MI`

* fix

* `stickyBottom`

* stickyTop
---
 packages/frontend/src/components/MkSigninDialog.vue | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'packages/frontend/src/components/MkSigninDialog.vue')

diff --git a/packages/frontend/src/components/MkSigninDialog.vue b/packages/frontend/src/components/MkSigninDialog.vue
index 51dea960aa..676a336ec7 100644
--- a/packages/frontend/src/components/MkSigninDialog.vue
+++ b/packages/frontend/src/components/MkSigninDialog.vue
@@ -70,7 +70,7 @@ function onLogin(res: Misskey.entities.SigninFlowResponse & { finished: true })
 	max-height: 450px;
 	box-sizing: border-box;
 	background: var(--MI_THEME-panel);
-	border-radius: var(--radius);
+	border-radius: var(--MI-radius);
 }
 
 .header {
@@ -83,7 +83,7 @@ function onLogin(res: Misskey.entities.SigninFlowResponse & { finished: true })
 	display: flex;
 	align-items: center;
 	font-weight: bold;
-	backdrop-filter: var(--blur, blur(15px));
+	backdrop-filter: var(--MI-blur, blur(15px));
 	background: var(--MI_THEME-acrylicBg);
 	z-index: 1;
 }
-- 
cgit v1.2.3-freya

