From f0544ede879361188733166f328c80a45afa5f0e Mon Sep 17 00:00:00 2001
From: syuilo <4439005+syuilo@users.noreply.github.com>
Date: Sat, 3 May 2025 16:51:23 +0900
Subject: tweak MkPullToRefresh

---
 packages/frontend/src/components/MkPullToRefresh.vue | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'packages/frontend/src/components/MkPullToRefresh.vue')

diff --git a/packages/frontend/src/components/MkPullToRefresh.vue b/packages/frontend/src/components/MkPullToRefresh.vue
index ad828c50b6..4910f34a1f 100644
--- a/packages/frontend/src/components/MkPullToRefresh.vue
+++ b/packages/frontend/src/components/MkPullToRefresh.vue
@@ -29,7 +29,7 @@ import { isHorizontalSwipeSwiping } from '@/utility/touch.js';
 
 const SCROLL_STOP = 10;
 const MAX_PULL_DISTANCE = Infinity;
-const FIRE_THRESHOLD = 230;
+const FIRE_THRESHOLD = 200;
 const RELEASE_TRANSITION_DURATION = 200;
 const PULL_BRAKE_BASE = 1.5;
 const PULL_BRAKE_FACTOR = 170;
@@ -239,7 +239,6 @@ onUnmounted(() => {
 	display: flex;
 	flex-direction: column;
 	align-items: center;
-	font-size: 14px;
 
 	> .icon, > .loader {
 		margin: 6px 0;
@@ -255,6 +254,7 @@ onUnmounted(() => {
 
 	> .text {
 		margin: 5px 0;
+		font-size: 90%;
 	}
 }
 </style>
-- 
cgit v1.2.3-freya

