From d9d796b204881fc14196b89230daa84564f599cf Mon Sep 17 00:00:00 2001
From: syuilo <4439005+syuilo@users.noreply.github.com>
Date: Sat, 29 Mar 2025 16:09:27 +0900
Subject: lint fixes

---
 packages/frontend/src/components/MkPullToRefresh.vue | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'packages/frontend/src/components/MkPullToRefresh.vue')

diff --git a/packages/frontend/src/components/MkPullToRefresh.vue b/packages/frontend/src/components/MkPullToRefresh.vue
index 1fbf00d212..b1df282514 100644
--- a/packages/frontend/src/components/MkPullToRefresh.vue
+++ b/packages/frontend/src/components/MkPullToRefresh.vue
@@ -82,11 +82,11 @@ function moveBySystem(to: number): Promise<void> {
 			return;
 		}
 		const startTime = Date.now();
-		let intervalId = setInterval(() => {
+		let intervalId = window.setInterval(() => {
 			const time = Date.now() - startTime;
 			if (time > RELEASE_TRANSITION_DURATION) {
 				pullDistance.value = to;
-				clearInterval(intervalId);
+				window.clearInterval(intervalId);
 				r();
 				return;
 			}
-- 
cgit v1.2.3-freya

