From c92508a57588f9237ec61a17b521e45e73672393 Mon Sep 17 00:00:00 2001
From: woxtu <woxtup@gmail.com>
Date: Thu, 21 Dec 2023 11:36:45 +0900
Subject: Remove unused imports (#12730)

---
 packages/frontend/src/components/MkPullToRefresh.vue | 3 +--
 1 file changed, 1 insertion(+), 2 deletions(-)

(limited to 'packages/frontend/src/components/MkPullToRefresh.vue')

diff --git a/packages/frontend/src/components/MkPullToRefresh.vue b/packages/frontend/src/components/MkPullToRefresh.vue
index 44555f2c13..54ef117d77 100644
--- a/packages/frontend/src/components/MkPullToRefresh.vue
+++ b/packages/frontend/src/components/MkPullToRefresh.vue
@@ -23,8 +23,7 @@ SPDX-License-Identifier: AGPL-3.0-only
 </template>
 
 <script lang="ts" setup>
-import { onMounted, onUnmounted, watch, ref, shallowRef } from 'vue';
-import { deviceKind } from '@/scripts/device-kind.js';
+import { onMounted, onUnmounted, ref, shallowRef } from 'vue';
 import { i18n } from '@/i18n.js';
 import { getScrollContainer } from '@/scripts/scroll.js';
 
-- 
cgit v1.2.3-freya

