From be7e3b9a0cb81b78a744993fef2fa2fd2833fa9c Mon Sep 17 00:00:00 2001
From: syuilo <4439005+syuilo@users.noreply.github.com>
Date: Sun, 9 Mar 2025 14:28:01 +0900
Subject: refactor(frontend): scripts -> utility

---
 packages/frontend/src/components/MkPullToRefresh.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'packages/frontend/src/components/MkPullToRefresh.vue')

diff --git a/packages/frontend/src/components/MkPullToRefresh.vue b/packages/frontend/src/components/MkPullToRefresh.vue
index 4fb4c6fe56..af4e2a4fe0 100644
--- a/packages/frontend/src/components/MkPullToRefresh.vue
+++ b/packages/frontend/src/components/MkPullToRefresh.vue
@@ -26,7 +26,7 @@ SPDX-License-Identifier: AGPL-3.0-only
 import { onMounted, onUnmounted, ref, shallowRef } from 'vue';
 import { i18n } from '@/i18n.js';
 import { getScrollContainer } from '@@/js/scroll.js';
-import { isHorizontalSwipeSwiping } from '@/scripts/touch.js';
+import { isHorizontalSwipeSwiping } from '@/utility/touch.js';
 
 const SCROLL_STOP = 10;
 const MAX_PULL_DISTANCE = Infinity;
-- 
cgit v1.2.3-freya

