From 7c06ffc4226bed945b252eb38e108ff6b85b5e93 Mon Sep 17 00:00:00 2001
From: syuilo <4439005+syuilo@users.noreply.github.com>
Date: Sat, 29 Mar 2025 17:28:20 +0900
Subject: refactor

---
 packages/frontend/src/components/MkPullToRefresh.vue | 9 ++-------
 1 file changed, 2 insertions(+), 7 deletions(-)

(limited to 'packages/frontend/src/components/MkPullToRefresh.vue')

diff --git a/packages/frontend/src/components/MkPullToRefresh.vue b/packages/frontend/src/components/MkPullToRefresh.vue
index b1df282514..22ae563d13 100644
--- a/packages/frontend/src/components/MkPullToRefresh.vue
+++ b/packages/frontend/src/components/MkPullToRefresh.vue
@@ -16,9 +16,8 @@ SPDX-License-Identifier: AGPL-3.0-only
 			</div>
 		</div>
 	</div>
-	<div :class="{ [$style.slotClip]: isPullStart }">
-		<slot/>
-	</div>
+
+	<slot/>
 </div>
 </template>
 
@@ -261,8 +260,4 @@ defineExpose({
 		margin: 5px 0;
 	}
 }
-
-.slotClip {
-	overflow-y: clip;
-}
 </style>
-- 
cgit v1.2.3-freya

