From 39f731804812d2e325c8b5c7c9077ff9c4835bc4 Mon Sep 17 00:00:00 2001
From: syuilo <Syuilotan@yahoo.co.jp>
Date: Sat, 4 Nov 2023 13:58:41 +0900
Subject: tweak MkPullToRefresh

---
 packages/frontend/src/components/MkPullToRefresh.vue | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'packages/frontend/src/components/MkPullToRefresh.vue')

diff --git a/packages/frontend/src/components/MkPullToRefresh.vue b/packages/frontend/src/components/MkPullToRefresh.vue
index 64c4d6e91d..00c1d3808e 100644
--- a/packages/frontend/src/components/MkPullToRefresh.vue
+++ b/packages/frontend/src/components/MkPullToRefresh.vue
@@ -32,8 +32,8 @@ const SCROLL_STOP = 10;
 const MAX_PULL_DISTANCE = Infinity;
 const FIRE_THRESHOLD = 230;
 const RELEASE_TRANSITION_DURATION = 200;
-const PULL_BRAKE_BASE = 2;
-const PULL_BRAKE_FACTOR = 200;
+const PULL_BRAKE_BASE = 1.5;
+const PULL_BRAKE_FACTOR = 170;
 
 let isPullStart = $ref(false);
 let isPullEnd = $ref(false);
-- 
cgit v1.2.3-freya

