From 389861f1da42e66fe52fe5d33ba4ade35aa16f23 Mon Sep 17 00:00:00 2001
From: かっこかり <67428053+kakkokari-gtyih@users.noreply.github.com>
Date: Fri, 16 Jan 2026 22:42:08 +0900
Subject: refactor(frontend): fix invalid self-closing tags (#17103)

* fix(frontend): fix invalid self-closing tags

* apply eslint rules

* fix

* fix
---
 packages/frontend/src/components/MkPullToRefresh.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'packages/frontend/src/components/MkPullToRefresh.vue')

diff --git a/packages/frontend/src/components/MkPullToRefresh.vue b/packages/frontend/src/components/MkPullToRefresh.vue
index 89aca5d29b..4d936758c5 100644
--- a/packages/frontend/src/components/MkPullToRefresh.vue
+++ b/packages/frontend/src/components/MkPullToRefresh.vue
@@ -18,7 +18,7 @@ SPDX-License-Identifier: AGPL-3.0-only
 		</div>
 	</div>
 
-	<slot/>
+	<slot></slot>
 </div>
 </template>
 
-- 
cgit v1.2.3-freya

