From a773f2976d9ab62ca335eb65b7356454fa2dea85 Mon Sep 17 00:00:00 2001
From: syuilo <4439005+syuilo@users.noreply.github.com>
Date: Sun, 16 Mar 2025 19:04:14 +0900
Subject: refactor(frontend): signinRequired -> ensureSignin

---
 packages/frontend/src/components/MkPasswordDialog.vue | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'packages/frontend/src/components/MkPasswordDialog.vue')

diff --git a/packages/frontend/src/components/MkPasswordDialog.vue b/packages/frontend/src/components/MkPasswordDialog.vue
index 24750012d0..2068ca39a1 100644
--- a/packages/frontend/src/components/MkPasswordDialog.vue
+++ b/packages/frontend/src/components/MkPasswordDialog.vue
@@ -44,9 +44,9 @@ import MkInput from '@/components/MkInput.vue';
 import MkButton from '@/components/MkButton.vue';
 import MkModalWindow from '@/components/MkModalWindow.vue';
 import { i18n } from '@/i18n.js';
-import { signinRequired } from '@/i.js';
+import { ensureSignin } from '@/i.js';
 
-const $i = signinRequired();
+const $i = ensureSignin();
 
 const emit = defineEmits<{
 	(ev: 'done', v: { password: string; token: string | null; }): void;
-- 
cgit v1.2.3-freya

