From 8ad6ffc2b3869aea08fb61b7f6afafc5ffa1a4d4 Mon Sep 17 00:00:00 2001
From: syuilo <4439005+syuilo@users.noreply.github.com>
Date: Thu, 22 May 2025 09:35:42 +0900
Subject: fix(frontend):
 UIのアニメーションをオフにするとページネーションが表示されない問題を修正
MIME-Version: 1.0
Content-Type: text/plain; charset=UTF-8
Content-Transfer-Encoding: 8bit

Fix #16078
---
 packages/frontend/src/components/MkPagination.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'packages/frontend/src/components/MkPagination.vue')

diff --git a/packages/frontend/src/components/MkPagination.vue b/packages/frontend/src/components/MkPagination.vue
index 717bc78cc4..4d55ac1900 100644
--- a/packages/frontend/src/components/MkPagination.vue
+++ b/packages/frontend/src/components/MkPagination.vue
@@ -5,12 +5,12 @@ SPDX-License-Identifier: AGPL-3.0-only
 
 <template>
 <component :is="prefer.s.enablePullToRefresh && pullToRefresh ? MkPullToRefresh : 'div'" :refresher="() => paginator.reload()">
+	<!-- :css="prefer.s.animation" にしたいけどバグる(おそらくvueのバグ) https://github.com/misskey-dev/misskey/issues/16078 -->
 	<Transition
 		:enterActiveClass="prefer.s.animation ? $style.transition_fade_enterActive : ''"
 		:leaveActiveClass="prefer.s.animation ? $style.transition_fade_leaveActive : ''"
 		:enterFromClass="prefer.s.animation ? $style.transition_fade_enterFrom : ''"
 		:leaveToClass="prefer.s.animation ? $style.transition_fade_leaveTo : ''"
-		:css="prefer.s.animation"
 		mode="out-in"
 	>
 		<MkLoading v-if="paginator.fetching.value"/>
-- 
cgit v1.2.3-freya

