From 6a5ef5b6f29eee9e36f42ac163f065880cd80e8b Mon Sep 17 00:00:00 2001
From: syuilo <Syuilotan@yahoo.co.jp>
Date: Fri, 19 May 2023 13:58:09 +0900
Subject: refactor

---
 packages/frontend/src/components/MkNotificationSettingWindow.vue | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

(limited to 'packages/frontend/src/components/MkNotificationSettingWindow.vue')

diff --git a/packages/frontend/src/components/MkNotificationSettingWindow.vue b/packages/frontend/src/components/MkNotificationSettingWindow.vue
index f6d0e5681d..598d3a0551 100644
--- a/packages/frontend/src/components/MkNotificationSettingWindow.vue
+++ b/packages/frontend/src/components/MkNotificationSettingWindow.vue
@@ -3,15 +3,15 @@
 	ref="dialog"
 	:width="400"
 	:height="450"
-	:with-ok-button="true"
-	:ok-button-disabled="false"
+	:withOkButton="true"
+	:okButtonDisabled="false"
 	@ok="ok()"
 	@close="dialog?.close()"
 	@closed="emit('closed')"
 >
 	<template #header>{{ i18n.ts.notificationSetting }}</template>
 
-	<MkSpacer :margin-min="20" :margin-max="28">
+	<MkSpacer :marginMin="20" :marginMax="28">
 		<div class="_gaps_m">
 			<template v-if="showGlobalToggle">
 				<MkSwitch v-model="useGlobalSetting">
-- 
cgit v1.2.3-freya

