From 13677ff2b0b14d715a65f2922d06f88efb4ba253 Mon Sep 17 00:00:00 2001
From: syuilo <Syuilotan@yahoo.co.jp>
Date: Wed, 28 Dec 2022 09:32:22 +0900
Subject: remove v-size directive

---
 packages/frontend/src/components/MkNotification.vue | 12 +-----------
 1 file changed, 1 insertion(+), 11 deletions(-)

(limited to 'packages/frontend/src/components/MkNotification.vue')

diff --git a/packages/frontend/src/components/MkNotification.vue b/packages/frontend/src/components/MkNotification.vue
index 8b8d3f452d..cb2f384553 100644
--- a/packages/frontend/src/components/MkNotification.vue
+++ b/packages/frontend/src/components/MkNotification.vue
@@ -1,5 +1,5 @@
 <template>
-<div ref="elRef" v-size="{ max: [500, 600] }" class="qglefbjs" :class="notification.type">
+<div ref="elRef" class="qglefbjs" :class="notification.type">
 	<div class="head">
 		<MkAvatar v-if="notification.type === 'pollEnded'" class="icon" :user="notification.note.user"/>
 		<MkAvatar v-else-if="notification.user" class="icon" :user="notification.user"/>
@@ -170,16 +170,6 @@ useTooltip(reactionRef, (showing) => {
 	display: flex;
 	contain: content;
 
-	&.max-width_600px {
-		padding: 16px;
-		font-size: 0.9em;
-	}
-
-	&.max-width_500px {
-		padding: 12px;
-		font-size: 0.85em;
-	}
-
 	> .head {
 		position: sticky;
 		top: 0;
-- 
cgit v1.2.3-freya

