From 13677ff2b0b14d715a65f2922d06f88efb4ba253 Mon Sep 17 00:00:00 2001
From: syuilo <Syuilotan@yahoo.co.jp>
Date: Wed, 28 Dec 2022 09:32:22 +0900
Subject: remove v-size directive

---
 packages/frontend/src/components/MkNoteSimple.vue | 18 +-----------------
 1 file changed, 1 insertion(+), 17 deletions(-)

(limited to 'packages/frontend/src/components/MkNoteSimple.vue')

diff --git a/packages/frontend/src/components/MkNoteSimple.vue b/packages/frontend/src/components/MkNoteSimple.vue
index 96d29831d2..354de1a614 100644
--- a/packages/frontend/src/components/MkNoteSimple.vue
+++ b/packages/frontend/src/components/MkNoteSimple.vue
@@ -1,5 +1,5 @@
 <template>
-<div v-size="{ min: [350, 500] }" class="yohlumlk">
+<div class="yohlumlk">
 	<MkAvatar class="avatar" :user="note.user"/>
 	<div class="main">
 		<XNoteHeader class="header" :note="note" :mini="true"/>
@@ -39,22 +39,6 @@ const showContent = $ref(false);
 	overflow: clip;
 	font-size: 0.95em;
 
-	&.min-width_350px {
-		> .avatar {
-			margin: 0 10px 0 0;
-			width: 44px;
-			height: 44px;
-		}
-	}
-
-	&.min-width_500px {
-		> .avatar {
-			margin: 0 12px 0 0;
-			width: 48px;
-			height: 48px;
-		}
-	}
-
 	> .avatar {
 		flex-shrink: 0;
 		display: block;
-- 
cgit v1.2.3-freya

