From dffefdad95ffe1018293f85a6eb9bdf9ee3eed53 Mon Sep 17 00:00:00 2001
From: happo31 <happo31@gmail.com>
Date: Thu, 13 Apr 2023 15:43:10 +0900
Subject: fix: #9998 MkNote.vue, MkNoteDetailed.vue
 で、特定のMFMによってフッターのボタンが押せなくなる (#9999)
MIME-Version: 1.0
Content-Type: text/plain; charset=UTF-8
Content-Transfer-Encoding: 8bit

* fix(client): add `overflow: clip;`

* fix(client): add `overflow: clip;`

* Revert "fix(client): add `overflow: clip;`"

This reverts commit c43226afde4741d61088192cbbab09fe97e1f2fb.

Revert "fix(client): add `overflow: clip;`"

This reverts commit c7225151056ff15b953aae806e7a07fa13fab746.

* feat(client): add z-index to .footer
---
 packages/frontend/src/components/MkNote.vue | 5 +++++
 1 file changed, 5 insertions(+)

(limited to 'packages/frontend/src/components/MkNote.vue')

diff --git a/packages/frontend/src/components/MkNote.vue b/packages/frontend/src/components/MkNote.vue
index 36ec778a14..cb4bb8f23e 100644
--- a/packages/frontend/src/components/MkNote.vue
+++ b/packages/frontend/src/components/MkNote.vue
@@ -484,6 +484,11 @@ function showReactions(): void {
 		}
 	}
 
+	.footer {
+		position: relative;
+		z-index: 1;
+	}
+
 	&:hover > .article > .main > .footer > .footerButton {
 		opacity: 1;
 	}
-- 
cgit v1.2.3-freya

