From 3bc81522c65d724de121cbe6265c60e48a8f8ae7 Mon Sep 17 00:00:00 2001
From: syuilo <4439005+syuilo@users.noreply.github.com>
Date: Tue, 3 Jun 2025 07:31:19 +0900
Subject: enhance(frontend): IDにUUIDを使うのをやめる (#16138)
MIME-Version: 1.0
Content-Type: text/plain; charset=UTF-8
Content-Transfer-Encoding: 8bit

* wip

* Update flash-edit.vue
---
 packages/frontend/src/components/MkMiniChart.vue | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'packages/frontend/src/components/MkMiniChart.vue')

diff --git a/packages/frontend/src/components/MkMiniChart.vue b/packages/frontend/src/components/MkMiniChart.vue
index 98bd471438..582073b878 100644
--- a/packages/frontend/src/components/MkMiniChart.vue
+++ b/packages/frontend/src/components/MkMiniChart.vue
@@ -32,7 +32,7 @@ SPDX-License-Identifier: AGPL-3.0-only
 
 <script lang="ts" setup>
 import { watch, ref } from 'vue';
-import { v4 as uuid } from 'uuid';
+import { genId } from '@/utility/id.js';
 import tinycolor from 'tinycolor2';
 import { useInterval } from '@@/js/use-interval.js';
 
@@ -42,7 +42,7 @@ const props = defineProps<{
 
 const viewBoxX = 50;
 const viewBoxY = 50;
-const gradientId = uuid();
+const gradientId = genId();
 const polylinePoints = ref('');
 const polygonPoints = ref('');
 const headX = ref<number | null>(null);
-- 
cgit v1.2.3-freya

